From 5fac8be0ae68cbbdf3514973cbf925a31a765ef5 Mon Sep 17 00:00:00 2001
From: Ven <vendicated@riseup.net>
Date: Sun, 23 Oct 2022 23:23:52 +0200
Subject: Vencord Standalone without git/node (#148)

---
 src/components/Settings.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/components/Settings.tsx')

diff --git a/src/components/Settings.tsx b/src/components/Settings.tsx
index 8ffe111..e720c6f 100644
--- a/src/components/Settings.tsx
+++ b/src/components/Settings.tsx
@@ -50,7 +50,6 @@ export default ErrorBoundary.wrap(function Settings() {
         }));
     }, []);
 
-
     return (
         <Forms.FormSection tag="h1" title="Vencord">
             <Forms.FormTitle tag="h5">
-- 
cgit 

